Congo: जेल से भागने की कोशिश में 129 कैदियों की मौत, भगदड़ में गई ज्यादातर की जान

Congo: अफ्रीका से बड़ी खबर आ रही है. यहां महाद्वीप के मध्य में स्थित कांगो की मुख्य जेल से भागने की कोशिश में कम से कम 129 कैदियों की मौत हो गई. बताया जा रहा है कि इनमें से ज्यादातर की मौत भगदड़ के कारण से हुई है. कांगो के गृह मंत्री जैकमिन शबानी ने […]

The post Congo: जेल से भागने की कोशिश में 129 कैदियों की मौत, भगदड़ में गई ज्यादातर की जान appeared first on The Printlines.