Betul: चुनाव ड्यूटी से लौट रही पुलिसकर्मियों की बस दुर्घटनाग्रस्त, 21 जवान घायल

बैतूलः मध्य प्रदेश से सड़क हादसे की खबर आ रही है. शनिवार को बैतूल के बरेठा घाट के पास लोकसभा चुनाव के पहले चरण में छिंदवाड़ा से चुनावी ड्यूटी पूरी कर राजगढ़ लौट रहे पुलिस और होमगार्ड जवानों की बस पलट गई. इस हादसे में बस में सवार 21 जवान घायल हो गए. सूचना पर […]

The post Betul: चुनाव ड्यूटी से लौट रही पुलिसकर्मियों की बस दुर्घटनाग्रस्त, 21 जवान घायल appeared first on The Printlines.