राजधानी दिल्‍ली मे कोरोना का कहर, अब तक 13 लोगों की जा चुकी हैं जान, 620 एक्टिव मामले

Corona in delhi: कोरोना अब देशभर में तेजी से पैर पसार रहा है. ऐसे में राजधानी दिल्‍ली में कोराना से एक और मौत की खबर आई है. दरअसल, 65 वर्षीय बुजुर्ग, जो कैंसर और किडनी संबंधी बीमारी से पीडित थे, की मौत हो गई. ऐसे में अब दिल्‍ली में कोरोना के 620 सक्रिय मरीज और […]

The post राजधानी दिल्‍ली मे कोरोना का कहर, अब तक 13 लोगों की जा चुकी हैं जान, 620 एक्टिव मामले appeared first on The Printlines.