भारतीय रेलवे को अल्स्टॉम ने सौंपा 500वां इलेक्ट्रिक इंजन, ‘Make in India’ के तहत दक्षता और लागत में सुधार

अल्स्टॉम ने भारतीय रेलवे (Indian Railways) को 500वां स्वदेशी इलेक्ट्रिक लोकोमोटिव (Indigenous Electric Locomotive) सौंपने की घोषणा की है. यह उपलब्धि रेलवे के आधुनिकीकरण और स्वदेशी निर्माण को बढ़ावा देने की दिशा में एक बड़ा कदम है. 500वां पूरी तरह भारत में निर्मित Prima T8 WAG-12B इलेक्ट्रिक लोकोमोटिव अल्स्टॉम के अत्याधुनिक मधेपुरा (बिहार) संयंत्र से […]

The post भारतीय रेलवे को अल्स्टॉम ने सौंपा 500वां इलेक्ट्रिक इंजन, ‘Make in India’ के तहत दक्षता और लागत में सुधार appeared first on The Printlines.