Reliance Industries Limited की दूसरी तिमाही के नतीजे घोषित, जानिए

मुकेश अंबानी की कंपनी रिलायंस इंडस्ट्रीज ने वित्त वर्ष 2024-25 की दूसरी तिमाही के नतीजे जारी किए हैं। कंपनी को 16,563 करोड़ रुपए का मुनाफा हुआ है, हालांकि सालाना आधार पर इसमें 4.77% की मामूली गिरावट देखी गई है। पिछले साल इसी तिमाही में कंपनी का मुनाफा 17394 करोड़ रुपए था। कंपनी ने सोमवार को […]

The post Reliance Industries Limited की दूसरी तिमाही के नतीजे घोषित, जानिए appeared first on The Printlines.