Govt Job: SSC ने बढ़ाई स्टेनोग्राफर के लिए रजिस्ट्रेशन की डेट, जानिए कब तक कर सकेंगे आवेदन

SSC stenographer Grade C exam:  कर्मचारी चयन आयोग (Staff Selection Commission) ने ग्रेड C परीक्षा 2018, 2019 के लिए रजिस्‍ट्रेशन करने की तिथि को बढ़ा कर 3 अक्टूबर तक कर दिया है. ऐसे में जो भी अभ्‍यर्थी अपना आवेदन करने से चूक गए थे, वो एसएससी के आधिकारिक बेवसाइट ssc.nic.in पर विजिट करके अपना रजिस्‍ट्रेशन […]

The post Govt Job: SSC ने बढ़ाई स्टेनोग्राफर के लिए रजिस्ट्रेशन की डेट, जानिए कब तक कर सकेंगे आवेदन appeared first on The Printlines.